Percentage of Disk Data Kept Uncompressed

6 8 10 13 16 20 25 32 40 50 63

KBytes to Decompress Per Day

10000

15849

25119

39811

63096

100000

158489

251189

6310 5

Seconds Per User Per Day

0.35

0.56

0.88

1.40

2.22

3.52

5.58

8.84

0.22 KBytes Per Day VS Cache Size CORONA

Percentage of Disk Data Kept Uncompressed

16 20 25 32 40 50 63

KBytes to Decompress Per Day

2512

3981

6310

10000

15849

25119

39811

63096

100000

1585 13

Seconds Per User Per Day

0.14

0.23

0.36

0.57

0.90

1.43

2.26

3.59

5.69

0.09 KBytes Per Day VS Cache Size HPCUPT1

Percentage of Disk Data Kept Uncompressed

13 16 20 25 32 40 50 63

KBytes to Decompress Per Day

6310

10000

15849

25119

39811

63096

100000

158489

251189

3981 10

Seconds Per User Per Day

1.79

2.84

4.50

7.14

11.3

17.9

28.4

45.0

71.4

1.13 KBytes Per Day VS Cache Size HPDBLPY

Percentage of Disk Data Kept Uncompressed

4 6 10 16 25 40 63

KBytes to Decompress Per Day

7943

10000

12589

15849

19953

25119

31623

39811

50119

63096

79433

6310 3

Seconds Per User Per Day

0.81

1.03

1.29

1.62

2.04

2.57

3.24

4.08

5.14

6.47

8.14

0.65 KBytes Per Day VS Cache Size HPPERF1

Percentage of Disk Data Kept Uncompressed

13 16 20 25 32 40 50 63

KBytes to Decompress Per Day

15849

25119

39811

63096

100000

158489

251189

10000 10

Seconds Per User Per Day

3.10

4.91

7.78

12.3

19.5

31.0

49.0

1.95 KBytes Per Day VS Cache Size HPISOI0

Percentage of Disk Data Kept Uncompressed

6 10 16 25 40 63

KBytes to Decompress Per Day

316

1000

3162

10000

31623

100 4

Seconds Per User Per Day

0.25

0.78

2.47

7.81

24.7

0.08 KBytes Per Day VS Cache Size HPISOI2

Percentage of Disk Data Kept Uncompressed

6 10 16 25 40 63

KBytes to Decompress Per Day

631 1000

1585

2512

3981

6310

10000

15849

25119

39811

398 4

Seconds Per User Per Day

0.33

0.53

0.83

1.32

2.10

3.32

5.26

8.34

13.2

21.0

0.21 KBytes Per Day VS Cache Size SAM

Percentage of Disk Data Kept Uncompressed

6 10 16 25 40 63

KBytes to Decompress Per Day

251 398 631 1000

1585

2512

3981

6310

10000

15849

25119

158 4

Seconds Per User Per Day

1.16

1.84

2.92

4.63

7.34

11.6

18.4

29.2

46.3

73.4

116.0

0.73 KBytes Per Day VS Cache Size UNH